

                    HINSTALL PROGRAM (hard disk installation)


You should be using this installation program only if you have a hard disk.


To get to this point you should have just completed the following steps:

   Step 1  You turned on your computer and waited for the  C>  to appear on
           the screen.
   Step 2  You inserted the OPUS disk into drive A and closed the drive door.
   Step 3  You typed  A:  then pressed <ENTER>.
   Step 4  You typed  HINSTALL  then pressed <ENTER>.

If you have not completed these steps correctly, then turn off your computer
and start again.  

If you have completed these steps correctly, then you are ready to install the
OPUS programs on your hard disk.  